From 05d41463b179b65c63997d7ce468232e5bf2689a Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Fri, 11 Apr 2025 15:16:40 -0300
Subject: src/content/incidents/index.adoc: Hoist links to variables

---
 src/content/incidents/index.adoc | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'src/content/incidents/index.adoc')

diff --git a/src/content/incidents/index.adoc b/src/content/incidents/index.adoc
index 6176538..9d57213 100644
--- a/src/content/incidents/index.adoc
+++ b/src/content/incidents/index.adoc
@@ -1,7 +1,10 @@
 = System status
 
+:feed: link:feed.xml
+:icon: image:../img/atom/light.svg
+
 Systems are operational, with no issues detected ✅
 // Ongoing instability on $SYSTEM ⚠️
 
 
-== Incident history link:atom.xml[image:img/atom.svg[Standard orange RSS feed icon]]
+== Incident history {feed}[{icon}[Standard orange RSS feed icon]]
-- 
cgit v1.2.3

