From d36c2e459a74ec67e523539eb98b78b95b01432a Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Wed, 16 Apr 2025 11:20:43 -0300
Subject: src/content/: Normalize [source,$lang] code blocks

---
 src/content/tils/2020/11/12/diy-nix-bash-ci.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/content/tils/2020/11/12/diy-nix-bash-ci.adoc')

diff --git a/src/content/tils/2020/11/12/diy-nix-bash-ci.adoc b/src/content/tils/2020/11/12/diy-nix-bash-ci.adoc
index 219b694..97ace30 100644
--- a/src/content/tils/2020/11/12/diy-nix-bash-ci.adoc
+++ b/src/content/tils/2020/11/12/diy-nix-bash-ci.adoc
@@ -12,7 +12,7 @@ to the server.
 In most of my project I like to keep a `test` attribute which runs the test with
 `nix-build -A test`.  This way, a post-receive hook could look like:
 
-[source,shell]
+[source,sh]
 ----
 #!/usr/bin/env bash
 set -Eeuo pipefail
-- 
cgit v1.2.3

