From 965e7a93464eebbd0f5c602c65a30819e8c2da81 Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Fri, 18 Apr 2025 04:37:15 -0300
Subject: src/content/en/tils/2020/12/29/svg.adoc: Fix local "link:"

Caught by "make check"!  I didn't commit this before only because I wasn't
running the tests, only the build.

nice
---
 src/content/en/tils/2020/12/29/svg.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/content/en/tils/2020/12/29/svg.adoc')

diff --git a/src/content/en/tils/2020/12/29/svg.adoc b/src/content/en/tils/2020/12/29/svg.adoc
index 0e5dec3..e0e75a5 100644
--- a/src/content/en/tils/2020/12/29/svg.adoc
+++ b/src/content/en/tils/2020/12/29/svg.adoc
@@ -1,7 +1,7 @@
 = SVG favicon
 :updatedat: 2021-01-12
 
-:favicon: link:../../../../img/favicon.svg
+:favicon: link:../../../../../img/favicon.svg
 
 I've wanted to change this website's favicon from a plain `.ico` file to a
 proper SVG.  The problem I was trying to solve was to reuse the same image on
-- 
cgit v1.2.3

