From 020c1e77489b772f854bb3288b9c8d2818a6bf9d Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Fri, 18 Apr 2025 02:17:12 -0300
Subject: git mv src/content/* src/content/en/

---
 .../en/tils/2020/11/12/diy-nix-bash-ci.adoc        | 63 ++++++++++++++++++++++
 1 file changed, 63 insertions(+)
 create mode 100644 src/content/en/tils/2020/11/12/diy-nix-bash-ci.adoc

(limited to 'src/content/en/tils/2020/11/12/diy-nix-bash-ci.adoc')

diff --git a/src/content/en/tils/2020/11/12/diy-nix-bash-ci.adoc b/src/content/en/tils/2020/11/12/diy-nix-bash-ci.adoc
new file mode 100644
index 0000000..97ace30
--- /dev/null
+++ b/src/content/en/tils/2020/11/12/diy-nix-bash-ci.adoc
@@ -0,0 +1,63 @@
+= DIY bare bones CI server with Bash and Nix
+:categories: ci
+:sort: 2
+
+:post-receive: https://git-scm.com/book/en/v2/Customizing-Git-Git-Hooks
+:example-project: https://euandreh.xyz/remembering/ci.html
+
+With a server with Nix installed (no need for NixOS), you can leverage its build
+isolation for running CI jobs by adding a {post-receive}[post-receive] Git hook
+to the server.
+
+In most of my project I like to keep a `test` attribute which runs the test with
+`nix-build -A test`.  This way, a post-receive hook could look like:
+
+[source,sh]
+----
+#!/usr/bin/env bash
+set -Eeuo pipefail
+set -x
+
+LOGS_DIR="/data/static/ci-logs/libedn"
+mkdir -p "$LOGS_DIR"
+LOGFILE="${LOGS_DIR}/$(date -Is)-$(git rev-parse master).log"
+exec &> >(tee -a "${LOGFILE}")
+
+unset GIT_DIR
+CLONE="$(mktemp -d)"
+git clone . "$CLONE"
+pushd "$CLONE"
+
+finish() {
+  printf "\n\n>>> exit status was %s\n" "$?"
+}
+trap finish EXIT
+
+nix-build -A test
+----
+
+We initially (lines #5 to #8) create a log file, named after _when_ the run is
+running and for _which_ commit it is running for.  The `exec` and `tee` combo
+allows the output of the script to go both to `stdout` _and_ the log file.  This
+makes the logs output show up when you do a `git push`.
+
+Lines #10 to #13 create a fresh clone of the repository and line #20 runs the
+test command.
+
+After using a similar post-receive hook for a while, I now even generate a
+simple HTML file to make the logs available ({example-project}[example project])
+through the browser.
+
+== Upsides
+
+No vendor lock-in, as all you need is a server with Nix installed.
+
+And if you pin the Nixpkgs version you're using, this very simple setup yields
+extremely sandboxed runs on a very hermetic environment.
+
+== Downsides
+
+Besides the many missing shiny features of this very simplistic CI, `nix-build`
+can be very resource intensive.  Specifically, it consumes too much memory.  So
+if it has to download too many things, or the build closure gets too big, the
+server might very well run out of memory.
-- 
cgit v1.2.3

