From d36c2e459a74ec67e523539eb98b78b95b01432a Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Wed, 16 Apr 2025 11:20:43 -0300
Subject: src/content/: Normalize [source,$lang] code blocks

---
 src/content/blog/2019/06/02/nixos-stateless-workstation.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/content/blog/2019/06/02/nixos-stateless-workstation.adoc')

diff --git a/src/content/blog/2019/06/02/nixos-stateless-workstation.adoc b/src/content/blog/2019/06/02/nixos-stateless-workstation.adoc
index 541440b..f89a106 100644
--- a/src/content/blog/2019/06/02/nixos-stateless-workstation.adoc
+++ b/src/content/blog/2019/06/02/nixos-stateless-workstation.adoc
@@ -106,7 +106,7 @@ I'm using {myrepos}[myrepos] to manage all my git repositories, and the general
 rule I apply is to add any repository specific configuration in myrepos'
 `checkout` phase:
 
-[source,shell]
+[source,sh]
 ----
 # sample ~/.mrconfig file snippet
 [dev/guix/guix]
-- 
cgit v1.2.3

