From d5795ea791bd49a8ef30f1c00c811f3f4975770e Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Tue, 1 Apr 2025 06:09:08 -0300
Subject: src/content/: Tweak asciidoc leftovers

---
 src/content/blog/2018/07/17/guix-nixos.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/content/blog/2018/07/17/guix-nixos.adoc')

diff --git a/src/content/blog/2018/07/17/guix-nixos.adoc b/src/content/blog/2018/07/17/guix-nixos.adoc
index aa42e4b..b9cd89b 100644
--- a/src/content/blog/2018/07/17/guix-nixos.adoc
+++ b/src/content/blog/2018/07/17/guix-nixos.adoc
@@ -162,7 +162,7 @@ guix-daemon = {
 };
 ----
 
-There you go! After running `sudo nixos-rebuild switch` I could get Guix up and
+There you go!  After running `sudo nixos-rebuild switch` I could get Guix up and
 running:
 
 [source,bash]
-- 
cgit v1.2.3

