From d36c2e459a74ec67e523539eb98b78b95b01432a Mon Sep 17 00:00:00 2001
From: EuAndreh <eu@euandre.org>
Date: Wed, 16 Apr 2025 11:20:43 -0300
Subject: src/content/: Normalize [source,$lang] code blocks

---
 src/content/blog/2018/07/17/guix-nixos.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/content/blog/2018/07/17/guix-nixos.adoc')

diff --git a/src/content/blog/2018/07/17/guix-nixos.adoc b/src/content/blog/2018/07/17/guix-nixos.adoc
index b9cd89b..42290f6 100644
--- a/src/content/blog/2018/07/17/guix-nixos.adoc
+++ b/src/content/blog/2018/07/17/guix-nixos.adoc
@@ -19,7 +19,7 @@ builds in the isolated environments.
 The {manual}[manual] already provides you with a ready to run (as root) command
 for creating the build users:
 
-[source,bash]
+[source,sh]
 ----
 groupadd --system guixbuild
 for i in `seq -w 1 10`;
@@ -37,7 +37,7 @@ However, In my personal NixOS I have disabled
 {mutable-users}[`users.mutableUsers`], which means that even if I run the above
 command it means that they'll be removed once I rebuild my OS:
 
-[source,shell]
+[source,sh]
 ----
 $ sudo nixos-rebuild switch
 (...)
@@ -165,7 +165,7 @@ guix-daemon = {
 There you go!  After running `sudo nixos-rebuild switch` I could get Guix up and
 running:
 
-[source,bash]
+[source,sh]
 ----
 $ guix package -i hello
 The following package will be installed:
-- 
cgit v1.2.3

